From 02b61d7f8f04ae5270979e83c6333647be5849a9 Mon Sep 17 00:00:00 2001
From: Aaron LI <aly@aaronly.me>
Date: Sun, 21 Jun 2020 23:21:59 +0800
Subject: resume.cls: Load 'microtype' after 'xeCJK' to avoid conflicts

With the latest TeXLive, I would get the following error if 'microtype'
was loaded before 'xeCJK':

    ! Undefined control sequence.
    <argument> \__xeCJK_patch_microtype_get_slot:

Change the loading orders fix the above issue.
---
 resume.cls | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'resume.cls')

diff --git a/resume.cls b/resume.cls
index 0e2e31f..4b2ebb0 100644
--- a/resume.cls
+++ b/resume.cls
@@ -12,7 +12,7 @@
 %%     https://www.latextemplates.com/template/plasmati-graduate-cv
 %%
 
-\ProvidesClass{resume}[2019/08/17 v2.4.7 Resume Class]
+\ProvidesClass{resume}[2020/06/21 v2.4.8 Resume Class]
 \LoadClass{article}
 
 %%
@@ -49,10 +49,10 @@
 \RequirePackage[skins]{tcolorbox}  % required by tikz to make the header
 \RequirePackage{csquotes}
 \RequirePackage[normalem]{ulem}
-\RequirePackage{microtype}
 \ifdef{\@zh}{
   \RequirePackage{xeCJK}
 }{}
+\RequirePackage{microtype}
 
 %
 % Hyperref
-- 
cgit v1.2.2

